                                                      Standardized Deviation

PDF

                   0

             0.1

             0.2

             0.3

             0.4

             0.5

                     -4.0 -3.0 -2.0 -1.0 0.0 1.0 2.0 3.0 4.0

                                        (a)

                                                                                                 BC

Standardized Deviation

0

0.1

0.2

0.3

0.4

0.5

-4.0 -3.0 -2.0 -1.0 0.0 1.0 2.0 3.0 4.0

(b)

VC