                                                                                      P o s itio n

Mean (g/m²)

                                0

                       200

                       400

                       600

                       800

                  1000

                                        0 100 200 300 400

                                                                                         BC  M o d e l
                                                       (a)

Position

Std. Dev. (g/m²)

0

100

200

300

400

500

0 100 200 300 400

BC Model
(b)

Position

0

10

20

30

40

50

0 100 200 300 400

VC Model
(d)

                                                                                    Position

                           0

                      20

                      40

                      60

                      80

                  100

                  120

                  140

                  160

                                  0 100 200 300 400

                                                                                    VC Model
                                             (c)