                                                              Standardiz ed Deviation

PDF

                    0.0

                    0.1

                    0.2

                    0.3

                    0.4

                    0.5

                             -4.0 -3.0 -2.0 -1.0 0.0 1.0 2.0 3.0 4.0

                                                 (a)

                                                                                      1 Hour W indow

St andardiz ed Deviation

0.0

0.1

0.2

0.3

0.4

0.5

-4.0 -3.0 -2.0 -1.0 0.0 1.0 2.0 3.0 4.0

( b)

8 Hour W indow