                                                                                                 J u ly  8 7

Std. Dev. (g/m²)

                             0

                         50

                    100

                    150

                    200

                    250

                    300

                                    9 10 11 12 13 14 15 16 17

                                                                               freq = 0 - 30 hr

                                                      (a )

-1

 J u ly  8 7

0

10

20

30

40

50

60

70

9 10 11 12 13 14 15 16 17
freq = 15 - 30 hr

(b) -1

                                                                                               J u ly  8 7

                        0

                    10

                    20

                    30

                    40

                    50

                    60

                    70

                               9 10 11 12 13 14 15 16 17

                                                                             freq = 7.5 - 15 hr

                                                 (c )

-1

 J u ly  8 7

0

10

20

30

40

50

60

70

9 10 11 12 13 14 15 16 17
freq = 3.75 - 7.5 hr

(d) -1