                                                                                                 July 87

Mean (g/m²)

                           0

                   100

                   200

                   300

                   400

                   500

                   600

                                  9 10 11 12 13 14 15 16 17

                                                       (a)

 July 87

Power Spectrum Slope

-4.0

-3.5

-3.0

-2.5

-2.0

-1.5

-1.0

-0.5

0.0

0.5

9 10 11 12 13 14 15 16 17

(b)