f (hr   )

Modulus

                                                          0.0

                                                          0.1

                                                          0.2

                                                          0.3

                                                          0.4

                                                          0.5

                                                          0.6

                                                          0.7

                                                          0.8

                                                          0.9

                                                          1.0

                                                                    0.00 3.75 7.50 11.25 15.00 18.75 22.50 26.25 30.00
d  (t        )

d  (t        )

d  (t        )

s  (t        )

1

2

3

3

-1
n/ 2

n/ 4

n/ 8

n/ 8